\section{Bug List}\label{bug}
\label{bug__bug000001}
 \begin{description}
\item[Member {\bf sound\_\-system}{\rm (p.\,\pageref{sound_8h_a0})}(unsigned nr) ]FIXME: register clobbers \end{description}


\label{bug__bug000002}
 \begin{description}
\item[Member {\bf calloc}{\rm (p.\,\pageref{stdlib_8h_a0})}(size\_\-t nmemb, size\_\-t size) ]multiplication overflow (elements $\ast$ size) is not detected \end{description}


\label{bug__bug000003}
 \begin{description}
\item[File {\bf time.h}{\rm (p.\,\pageref{time_8h})} ]time\_\-t is a 32 bit value which will overflow after 49.7 days of continuous operation. \end{description}
