\section{demo/c++/sensor.C File Reference}
\label{sensor_8C}\index{demo/c++/sensor.C@{demo/c++/sensor.C}}
{\tt \#include $<$config.h$>$}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
int {\bf main} (int argc, char $\ast$$\ast$argv)
\begin{CompactList}\small\item\em the user {\bf main()}{\rm (p.\,\pageref{fontdesign_8c_a1})} \item\end{CompactList}\end{CompactItemize}


\subsection{Function Documentation}
\index{sensor.C@{sensor.C}!main@{main}}
\index{main@{main}!sensor.C@{sensor.C}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int main (int {\em argc}, char $\ast$$\ast$ {\em argv})}\label{sensor_8C_a0}


the user {\bf main()}{\rm (p.\,\pageref{fontdesign_8c_a1})} 



Definition at line 43 of file sensor.C.