\section{symbol\_\-t Struct Reference}
\label{structsymbol__t}\index{symbol_t@{symbol\_\-t}}
symbol type.  


\subsection*{Data Fields}
\begin{CompactItemize}
\item 
unsigned {\bf addr}
\item 
char {\bf text} [MAX\_\-SYMLEN]
\end{CompactItemize}


\subsection{Detailed Description}
symbol type. 



Definition at line 34 of file genlds.c.

\subsection{Field Documentation}
\index{symbol_t@{symbol\_\-t}!addr@{addr}}
\index{addr@{addr}!symbol_t@{symbol\_\-t}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}unsigned {\bf symbol\_\-t::addr}}\label{structsymbol__t_o0}




Definition at line 35 of file genlds.c.

Referenced by read\_\-symbols().\index{symbol_t@{symbol\_\-t}!text@{text}}
\index{text@{text}!symbol_t@{symbol\_\-t}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}char {\bf symbol\_\-t::text}[MAX\_\-SYMLEN]}\label{structsymbol__t_o1}




Definition at line 36 of file genlds.c.

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
util/dll-src/{\bf genlds.c}\end{CompactItemize}
