\section{Todo List}\label{todo}
\label{todo__todo000001}
 \begin{description}
\item[Member {\bf delay}{\rm (p.\,\pageref{conio_8h_a1})}(unsigned ms) ]why is {\bf delay()}{\rm (p.\,\pageref{conio_8h_a1})} in this file? \end{description}


\label{todo__todo000002}
 \begin{description}
\item[Member {\bf ASMVOLATILE}{\rm (p.\,\pageref{rom_2lcd_8h_a4})} ](when move to g++ 3.x) determine if this is still the case and fix this if not... \end{description}


\label{todo__todo000003}
 \begin{description}
\item[Member {\bf T\_\-DEAD}{\rm (p.\,\pageref{tm_8h_a3})} ]the following comments on the defined may cause problems in when used in macros/expressions, etc. Fix\-Em? \end{description}
