\section{include/unistd.h File Reference}
\label{unistd_8h}\index{include/unistd.h@{include/unistd.h}}
Interface: reduced UNIX standard library. 

{\tt \#include $<$tm.h$>$}\par
{\tt \#include $<$time.h$>$}\par
\subsection*{Defines}
\begin{CompactItemize}
\item 
\#define {\bf sleep}(s)\ delay(1000$\ast$(s))
\item 
\#define {\bf msleep}(s)\ delay(s)
\end{CompactItemize}
\subsection*{Functions}
\begin{CompactItemize}
\item 
{\bf wakeup\_\-t} {\bf wait\_\-event} ({\bf wakeup\_\-t}($\ast$wakeup)({\bf wakeup\_\-t}), {\bf wakeup\_\-t} data)
\end{CompactItemize}


\subsection{Detailed Description}
Interface: reduced UNIX standard library. 

\begin{Desc}
\item[Author:]Markus L. Noga $<${\tt markus@noga.de}$>$\end{Desc}


Definition in file {\bf unistd.h}.

\subsection{Define Documentation}
\index{unistd.h@{unistd.h}!msleep@{msleep}}
\index{msleep@{msleep}!unistd.h@{unistd.h}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}\#define msleep(s)\ delay(s)}\label{unistd_8h_a1}




Definition at line 123 of file unistd.h.\index{unistd.h@{unistd.h}!sleep@{sleep}}
\index{sleep@{sleep}!unistd.h@{unistd.h}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}\#define sleep(s)\ delay(1000$\ast$(s))}\label{unistd_8h_a0}




Definition at line 122 of file unistd.h.

Referenced by main(), and State\-Changer::on\-Off().

\subsection{Function Documentation}
\index{unistd.h@{unistd.h}!wait_event@{wait\_\-event}}
\index{wait_event@{wait\_\-event}!unistd.h@{unistd.h}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf wakeup\_\-t} wait\_\-event ({\bf wakeup\_\-t}($\ast$)({\bf wakeup\_\-t}) {\em wakeup}, {\bf wakeup\_\-t} {\em data})\hspace{0.3cm}{\tt  [inline]}}\label{unistd_8h_a2}




Definition at line 112 of file unistd.h.

References \_\-tdata\_\-t::wakeup, and wakeup\_\-t.